create table sys_logininfor
(
    info_id        bigint                        not null comment '访问ID'
        primary key,
    tenant_id      varchar(20)  default '000000' null comment '租户编号',
    user_name      varchar(50)  default ''       null comment '用户账号',
    client_key     varchar(32)  default ''       null comment '客户端',
    device_type    varchar(32)  default ''       null comment '设备类型',
    ipaddr         varchar(128) default ''       null comment '登录IP地址',
    login_location varchar(255) default ''       null comment '登录地点',
    browser        varchar(50)  default ''       null comment '浏览器类型',
    os             varchar(50)  default ''       null comment '操作系统',
    status         char         default '0'      null comment '登录状态（0成功 1失败）',
    msg            varchar(255) default ''       null comment '提示消息',
    login_time     datetime                      null comment '访问时间'
)
    comment '系统访问记录';

create index idx_sys_logininfor_lt
    on sys_logininfor (login_time);

create index idx_sys_logininfor_s
    on sys_logininfor (status);

INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959256188270440449, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:07:31');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959256865545678849, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:10:13');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959256902489108481, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:10:21');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959256958868942849, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:10:35');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959256986920448002, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:10:42');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959257355314556930, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:12:09');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959257411404984321, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码错误', '2025-08-23 22:12:23');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959257428798763009, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:12:27');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959257579034537986, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:13:03');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959257611116769282, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:13:10');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959258029997715457, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:14:50');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959258051459969026, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:14:55');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959258242955112450, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:15:41');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959258266451603458, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:15:47');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959261303383552002, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:27:51');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959261386061672449, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:28:10');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959262887433797634, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:34:08');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959262916777148418, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:34:15');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959263134453137409, '889144', 'wangkang', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-23 22:35:07');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959263167755911169, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-23 22:35:15');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959564832270819329, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-24 18:33:58');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959895259487965185, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-25 16:26:58');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959923159113175041, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-25 18:17:49');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1959971116852219906, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-25 21:28:23');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960148532396593153, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-08-26 09:13:23');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960148547928100866, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 09:13:26');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960171191586684930, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-08-26 10:43:25');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960171209248899074, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码错误', '2025-08-26 10:43:29');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960171231952666626, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 10:43:35');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960315034601066498, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:15:00');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316111962574850, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:19:17');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316188164689921, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:19:35');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316261359489026, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:19:52');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316309367492610, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:20:04');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316497863708673, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:20:49');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316568407707650, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码错误', '2025-08-26 20:21:05');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960316586090893313, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:21:10');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318005959266306, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:26:48');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318033394208769, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:26:55');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318130228105218, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:27:18');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318158971670530, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:27:25');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318407660343297, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:28:24');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960318438303928322, '938163', 'gaoli', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:28:31');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960319120679440385, '938163', 'gaoli', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:31:14');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960319184546107394, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:31:29');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960319699866685441, '938163', 'emoonadmin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-08-26 20:33:32');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960319725523243009, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 20:33:38');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1960332960456577026, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-08-26 21:26:14');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966081600797720578, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-11 18:09:16');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966311435918811138, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 09:22:33');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966320717183799297, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-12 09:59:26');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966321381020467201, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 10:02:04');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966330421695938562, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码错误', '2025-09-12 10:38:00');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966330550758842370, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 10:38:31');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966331594490425346, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-12 10:42:39');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966331610072264705, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 10:42:43');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966336839069159426, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 11:03:30');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966337224911572994, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-12 11:05:02');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966700407745441793, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-13 11:08:11');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1966713185218605058, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-13 11:58:58');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1967496378942799873, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-09-15 15:51:06');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1967496393719332866, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-15 15:51:09');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1967774286403538945, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-16 10:15:24');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1967774737073115137, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-16 10:17:11');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1967785633132879874, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-16 11:00:29');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968126704819531778, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-17 09:35:47');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968250804490006529, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-17 17:48:55');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968606370634719234, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-18 17:21:48');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968841693528600578, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 08:56:54');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968861825701257217, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 10:16:54');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968948093340639233, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 15:59:41');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968981439630323714, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 18:12:12');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1968997049277964289, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-19 19:14:13');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969000788437065730, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 19:29:05');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969055985087672321, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-19 23:08:25');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969222317718974466, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-20 10:09:22');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969222380277018626, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-20 10:09:36');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969222423436406786, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-20 10:09:47');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969228910342778882, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-09-20 10:35:33');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1969228936448126977, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-20 10:35:40');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1970046005478981633, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-22 16:42:24');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1970142339888427010, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-22 23:05:12');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1970144073016676353, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-22 23:12:05');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1970144132110225409, '000000', 'wangkangtest', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-22 23:12:19');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1970144612769075202, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-22 23:14:14');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971089361341116417, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 13:48:19');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971090106039791618, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-09-25 13:51:17');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971090123647479809, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 13:51:21');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971090123987218434, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 13:51:21');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093201218007041, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:03:35');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093201524191233, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:03:35');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093259778879489, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:03:49');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093259988594689, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:03:49');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093294646128641, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:03:57');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093294813900802, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:03:57');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093506533953537, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:04:48');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093506752057345, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:04:48');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093544714702850, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '1', '验证码已失效', '2025-09-25 14:04:57');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093568706121729, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:05:03');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093568878088193, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:05:03');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093690684870657, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:05:32');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971093690852642818, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:05:32');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971094108580155394, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Safari', 'OSX', '0', '登录成功', '2025-09-25 14:07:11');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971094291133042690, '000000', 'admin', 'pc', 'pc', '127.0.0.1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:07:55');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971101530237505537, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '退出成功', '2025-09-25 14:36:41');
INSERT INTO ruoyi.sys_logininfor (info_id, tenant_id, user_name, client_key, device_type, ipaddr, login_location, browser, os, status, msg, login_time) VALUES (1971101778661937153, '000000', 'admin', 'pc', 'pc', '0:0:0:0:0:0:0:1', '内网IP', 'Chrome', 'OSX', '0', '登录成功', '2025-09-25 14:37:40');
